-- phpMyAdmin SQL Dump
-- version 2.10.1
-- http://www.phpmyadmin.net
-- 
-- Host: localhost
-- Generation Time: Aug 17, 2012 at 06:24 PM
-- Server version: 5.0.41
-- PHP Version: 5.2.2

SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";

-- 
-- Database: `user`
-- 

-- --------------------------------------------------------

-- 
-- Table structure for table `ad`
-- 

CREATE TABLE `ad` (
  `user` varchar(100) NOT NULL,
  `pass` varchar(100) NOT NULL,
  PRIMARY KEY  (`user`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8;

-- 
-- Dumping data for table `ad`
-- 

INSERT INTO `ad` VALUES ('admin', '123456');

-- --------------------------------------------------------

-- 
-- Table structure for table `link`
-- 

CREATE TABLE `link` (
  `STT` varchar(100) NOT NULL,
  `CHUCNANG` varchar(100) NOT NULL,
  `GHICHU` varchar(100) NOT NULL,
  PRIMARY KEY  (`STT`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8;

-- 
-- Dumping data for table `link`
-- 

INSERT INTO `link` VALUES ('01', 'Ftp Server', 'ftp://ngoctien.hopto.org');
INSERT INTO `link` VALUES ('02', 'Mail Server', 'http://ngoctien.hopto.org:1000');
INSERT INTO `link` VALUES ('03', 'Mail Clien', 'http://ngoctien.hopto.org:3000');
INSERT INTO `link` VALUES ('04', 'DATABASE', 'http://ngoctien.hopto.org/phpmyadmin/index.php');
